Automated wordcount: 9

This was file was automatically generated by a google docs scraper, intended for use with e-reading devices. If you wish to have this removed from this list, email ra.llan.pcl+complaints @ gmail.com.

Story moved to

http://www.fimfiction.net/story/21952/an-imaginative-performance